WMAP Cosmological Parameters Model: wcdm+sz+lens Data: wmap5+bao 10^2Ω_bh^2 2.261^{+0.058}_{−0.059} 1 − n_s 0.042 ± 0.015 1 − n_s 0.013 < 1 − n_s < 0.071 (95% CL) 1 + w −0.15^{+0.21}_{−0.22} 1 + w −0.68 < 1 + w < 0.21 (95% CL) A_{BAO}(z = 0.35) 0.467 ± 0.012 C_{220} 5745 ± 42 d_A(z_{eq}) 14149 ± 186 Mpc d_A(z_∗) 13983^{+187}_{−188} Mpc Δ^2_R (2.48 ± 0.13) × 10^{−9} h 0.739^{+0.047}_{−0.048} H_0 73.9^{+4.7}_{−4.8} km/s/Mpc k_{eq} 0.01009^{+0.00050}_{−0.00049} ℓ_{eq} 141.0^{+5.2}_{−5.1} ℓ_∗ 302.24 ± 0.83 n_s 0.958 ± 0.015 Ω_b 0.0419^{+0.0055}_{−0.0056} Ω_bh^2 0.02261^{+0.00058}_{−0.00059} Ω_c 0.213 ± 0.021 Ω_ch^2 0.1156^{+0.0068}_{−0.0066} Ω_Λ 0.745 ± 0.026 Ω_m 0.255 ± 0.026 Ω_mh^2 0.1382^{+0.0068}_{−0.0067} r_{hor}(z_{dec}) 283.0^{+3.5}_{−3.6} Mpc r_s(z_d) 151.8 ± 2.0 Mpc r_s(z_d)/D_v(z = 0.2) 0.1939 ± 0.0058 r_s(z_d)/D_v(z = 0.35) 0.1151 ± 0.0023 r_s(z_∗) 145.3 ± 1.8 Mpc R 1.733 ± 0.022 σ_8 0.863^{+0.094}_{−0.090} A_{SZ} 0.99^{+0.67}_{−0.99} t_0 13.68 ± 0.13 Gyr τ 0.083 ± 0.016 θ_∗ 0.010395 ± 0.000029 θ_∗ 0.5956 ± 0.0016^∘ t_∗ 374846^{+5993}_{−6145} yr w −1.15^{+0.21}_{−0.22} z_{dec} 1088.4 ± 1.2 z_d 1020.8^{+1.5}_{−1.4} z_{eq} 3311^{+163}_{−160} z_{reion} 10.8 ± 1.4 z_∗ 1091.2 ± 1.0